const UnderConstruction = () => (
	<svg
		width="528"
		height="436"
		viewBox="0 0 528 436"
		fill="none"
		xmlns="http://www.w3.org/2000/svg"
	>
		<path
			fillRule="evenodd"
			clipRule="evenodd"
			d="M327.415 53.7145L190.348 13.237L208.677 53.7145H327.415ZM117.61 53.7145L166.498 19.6267L148.512 53.7145H117.61ZM197.7 53.7145H159.819L180.204 15.0787L197.7 53.7145ZM362.723 53.7145L181.942 0.327613C179.611 -0.360674 177.094 0.0477853 175.1 1.43777L108 48.2245V46.7145C108 43.4008 105.314 40.7145 102 40.7145H53C49.6863 40.7145 47 43.4008 47 46.7145V122.715C47 126.028 49.6863 128.715 53 128.715H102C105.314 128.715 108 126.028 108 122.715V114.715H149V164.199C150.111 164.026 151.206 163.96 152.242 163.96H159.742V163.981C160.039 163.967 160.339 163.96 160.642 163.96C161.074 163.96 161.516 163.977 161.966 164.014L159.792 161.841L200 121.633V163.967C202.847 164.028 205.629 164.473 208.245 165.436C208.839 165.651 209.425 165.893 210 166.163V114.715H301V115.715V138.715C301 142.028 303.686 144.715 307 144.715H338V148.715V164.671C339.826 164.136 341.679 163.96 343.375 163.96H348V148.715H368V163.96H375.01V168.308C375.757 167.458 376.671 166.696 377.771 166.061C377.847 166.017 377.923 165.973 378 165.93V148.715V144.715H411C414.314 144.715 417 142.028 417 138.715V115.715V114.715H472.972C478.328 114.715 482.171 109.555 480.637 104.423L467.186 59.4234C466.173 56.0357 463.057 53.7145 459.521 53.7145H362.723ZM378 210.04V231.715C378 235.028 375.314 237.715 372 237.715H364.294V284.182C364.294 288.771 366.252 293.142 369.677 296.197L373.571 299.671C383.131 308.199 383.131 323.151 373.571 331.679C365.436 338.936 353.152 338.936 345.017 331.679L340.672 327.802C338.611 325.964 338.431 322.803 340.269 320.742C342.107 318.682 345.268 318.502 347.328 320.34L351.674 324.217C356.016 328.09 362.572 328.09 366.914 324.217C372.016 319.665 372.016 311.685 366.914 307.133L363.02 303.66C357.469 298.707 354.294 291.621 354.294 284.182V237.715H344C340.686 237.715 338 235.028 338 231.715V209.992C340.541 209.848 343.327 209.335 345.734 207.891C346.6 207.372 347.353 206.773 348 206.113V227.715H368V209.845C368.926 209.976 369.864 210.04 370.81 210.04C371.4 210.04 371.98 210.016 372.55 209.969V210.04H378ZM210 207.874V362.978L260.218 394.891C261.951 395.992 263 397.902 263 399.955V429.715C263 433.028 260.314 435.715 257 435.715H102C98.6863 435.715 96 433.028 96 429.715V399.955C96 397.902 97.0494 395.992 98.7819 394.891L149 362.978V209.779C150.908 209.497 152.854 208.939 154.601 207.891C156.698 206.633 158.133 204.91 159 202.985V252.179L197.494 213.685L193.106 209.297C195.136 209.808 197.236 210.04 199.37 210.04C202.47 210.04 205.497 209.601 208.341 208.573L208.407 208.549L208.472 208.524C208.987 208.327 209.497 208.111 210 207.874ZM178.97 195.161C178.729 193.967 178.61 192.744 178.61 191.5V183.1C178.61 182.322 178.652 181.551 178.739 180.788L173.338 175.387C173.354 175.657 173.362 175.928 173.362 176.2C173.362 178.662 172.668 181.227 170.943 183.445L169.329 185.52L178.97 195.161ZM151.388 176.067C151.402 176.047 151.416 176.027 151.431 176.008C151.439 175.996 151.447 175.985 151.456 175.973C151.433 176.005 151.41 176.036 151.388 176.067ZM186.19 192.86C186.196 192.908 186.202 192.956 186.209 193.004C186.209 193.004 186.209 193.004 186.209 193.005C186.321 193.837 186.529 194.632 186.833 195.389C186.84 195.406 186.847 195.423 186.853 195.44C187.103 196.051 187.415 196.638 187.79 197.2C188.49 198.25 189.362 199.159 190.405 199.928C190.495 199.994 190.586 200.059 190.678 200.123C190.695 200.135 190.712 200.147 190.73 200.159M199.529 202.539C199.536 202.539 199.543 202.539 199.55 202.539C199.55 202.539 199.55 202.539 199.55 202.539C201.877 202.523 203.957 202.183 205.79 201.52C206.902 201.094 207.868 200.584 208.686 199.99M207.395 183.643C207.402 183.642 207.409 183.641 207.416 183.64C207.425 183.639 207.433 183.638 207.442 183.637C207.426 183.639 207.41 183.641 207.395 183.643ZM206.553 183.699C206.559 183.698 206.564 183.698 206.57 183.698C206.578 183.698 206.586 183.698 206.595 183.698C206.581 183.698 206.567 183.698 206.553 183.699ZM204.485 180.344C204.425 180.258 204.362 180.173 204.297 180.09L204.485 180.344ZM203.354 194.925C203.368 194.916 203.381 194.906 203.394 194.896C203.381 194.906 203.368 194.916 203.354 194.925ZM204.398 193.918C204.411 193.901 204.425 193.883 204.439 193.866C204.426 193.882 204.414 193.898 204.401 193.913C204.4 193.915 204.399 193.917 204.398 193.918ZM204.49 193.797C204.506 193.776 204.521 193.755 204.537 193.734L204.526 193.749C204.514 193.765 204.502 193.781 204.49 193.797ZM206.333 190.362C206.408 190.361 206.487 190.36 206.57 190.36C206.508 190.36 206.448 190.36 206.39 190.361C206.37 190.361 206.351 190.362 206.333 190.362ZM57 118.715V50.7145H98V118.715H57ZM108 97.7465V63.7145H142.032L108 97.7465ZM204.52 102.881L165.354 63.7145H243.687L204.52 102.881ZM308.208 102.881L269.042 63.7145H347.375L308.208 102.881ZM409.863 102.881L370.696 63.7145H449.03L409.863 102.881ZM422.172 104.715L459.214 67.6719L470.287 104.715H422.172ZM359.036 66.1958L397.554 104.715H320.517L359.036 66.1958ZM256.364 65.1792L295.9 104.715H216.829L256.364 65.1792ZM153.693 66.1957L192.212 104.715H115.174L153.693 66.1957ZM159 114.715H192.776L159 148.491V114.715ZM197.494 315.34L159 353.834V276.846L197.494 315.34ZM200 225.321L160.809 264.512L200 303.703V225.321ZM165.261 361.715H200V326.976L165.261 361.715ZM106 402.152L153.896 371.715H205.104L253 402.152V425.715H106V402.152ZM407 115.715H311V134.715H407V115.715Z"
			fill="white"
		/>
		<path
			d="M20.94 202.54C17.58 202.54 14.54 201.86 11.82 200.5C9.14 199.14 7.04 197.26 5.52 194.86C4 192.46 3.24 189.74 3.24 186.7V165.4C3.24 163.48 3.92 162.02 5.28 161.02C6.64 159.98 8.64 159.46 11.28 159.46V186.7C11.28 189.38 12.16 191.52 13.92 193.12C15.68 194.72 18.02 195.52 20.94 195.52C23.86 195.52 26.2 194.72 27.96 193.12C29.72 191.52 30.6 189.38 30.6 186.7V165.4C30.6 163.44 31.28 161.96 32.64 160.96C34 159.96 36 159.46 38.64 159.46V186.7C38.64 189.74 37.88 192.46 36.36 194.86C34.84 197.26 32.72 199.14 30 200.5C27.32 201.86 24.3 202.54 20.94 202.54ZM45.3759 177.22C45.3759 175.38 45.9559 173.96 47.1159 172.96C48.3159 171.96 50.1159 171.46 52.5159 171.46V175.06C52.0359 175.62 51.5559 176.26 51.0759 176.98L51.4359 177.22C52.6359 175.42 54.1759 174.02 56.0559 173.02C57.9359 171.98 60.0159 171.46 62.2959 171.46C64.3359 171.46 66.1359 171.92 67.6959 172.84C69.2559 173.76 70.4559 175.02 71.2959 176.62C72.1759 178.22 72.6159 180.02 72.6159 182.02V197.98C72.6159 199.58 71.9959 200.74 70.7559 201.46C69.5159 202.18 67.6359 202.54 65.1159 202.54V183.1C65.1159 181.58 64.6559 180.34 63.7359 179.38C62.8559 178.42 61.5559 177.94 59.8359 177.94C57.7959 177.94 56.1159 178.58 54.7959 179.86C53.4759 181.1 52.8159 182.66 52.8159 184.54V197.98C52.8159 199.58 52.2159 200.74 51.0159 201.46C49.8159 202.18 47.9359 202.54 45.3759 202.54V177.22ZM90.3417 202.54C88.1817 202.54 86.2417 202.08 84.5217 201.16C82.8017 200.24 81.4417 198.98 80.4417 197.38C79.4417 195.74 78.9417 193.86 78.9417 191.74V182.26C78.9417 180.18 79.4617 178.32 80.5017 176.68C81.5417 175.04 82.9817 173.76 84.8217 172.84C86.7017 171.92 88.7817 171.46 91.0617 171.46C92.5417 171.46 94.0617 171.78 95.6217 172.42C97.2217 173.02 98.5617 173.84 99.6417 174.88L99.8817 174.58C99.6817 174.26 99.2417 173.86 98.5617 173.38V164.5C98.5617 162.9 99.1817 161.66 100.422 160.78C101.702 159.9 103.622 159.46 106.182 159.46V197.38C106.182 198.86 105.622 200.1 104.502 201.1C103.382 202.06 101.642 202.54 99.2817 202.54V199.24C99.8017 198.6 100.182 198.08 100.422 197.68L100.122 197.44C98.8817 199.12 97.5017 200.4 95.9817 201.28C94.5017 202.12 92.6217 202.54 90.3417 202.54ZM92.5617 196.06C94.3617 196.06 95.8217 195.64 96.9417 194.8C98.1017 193.92 98.6817 192.82 98.6817 191.5V182.44C98.6817 181.16 98.1017 180.1 96.9417 179.26C95.8217 178.38 94.3417 177.94 92.5017 177.94C90.5417 177.94 89.0217 178.36 87.9417 179.2C86.9017 180 86.3817 181.16 86.3817 182.68V191.2C86.3817 192.8 86.9017 194.02 87.9417 194.86C89.0217 195.66 90.5617 196.06 92.5617 196.06ZM126.308 202.54C123.828 202.54 121.568 202.06 119.528 201.1C117.488 200.1 115.868 198.76 114.668 197.08C113.468 195.36 112.868 193.44 112.868 191.32V183.34C112.868 181.1 113.488 179.08 114.728 177.28C115.968 175.48 117.608 174.06 119.648 173.02C121.728 171.98 123.968 171.46 126.368 171.46C128.728 171.46 130.888 171.96 132.848 172.96C134.848 173.92 136.428 175.28 137.588 177.04C138.748 178.76 139.328 180.74 139.328 182.98V186.34C139.328 187.22 138.988 187.96 138.308 188.56C137.668 189.16 136.848 189.46 135.848 189.46H120.128V190.78C120.128 192.5 120.648 193.9 121.688 194.98C122.728 196.06 124.288 196.6 126.368 196.6C128.368 196.6 129.848 196.16 130.808 195.28C131.808 194.4 132.308 193.26 132.308 191.86C133.028 191.78 133.528 191.74 133.808 191.74C135.288 191.74 136.448 192.08 137.288 192.76C138.128 193.4 138.548 194.32 138.548 195.52C138.548 196.68 138.008 197.8 136.928 198.88C135.848 199.96 134.368 200.84 132.488 201.52C130.608 202.2 128.548 202.54 126.308 202.54ZM132.548 184.12V182.98C132.548 181.3 131.968 179.94 130.808 178.9C129.648 177.86 128.148 177.34 126.308 177.34C124.468 177.34 122.968 177.86 121.808 178.9C120.688 179.9 120.128 181.26 120.128 182.98V184.12H132.548ZM160.523 177.94C158.163 177.94 156.243 178.58 154.763 179.86C153.283 181.1 152.543 182.66 152.543 184.54V197.98C152.543 199.58 151.943 200.74 150.743 201.46C149.543 202.18 147.663 202.54 145.103 202.54V177.22C145.103 175.38 145.683 173.96 146.843 172.96C148.043 171.96 149.843 171.46 152.243 171.46V175C151.643 175.68 151.163 176.34 150.803 176.98L151.163 177.22C153.683 173.38 156.843 171.46 160.643 171.46C162.363 171.46 163.663 171.92 164.543 172.84C165.423 173.72 165.863 174.84 165.863 176.2C165.863 177.24 165.583 178.12 165.023 178.84C163.943 178.24 162.443 177.94 160.523 177.94ZM199.37 202.54C196.77 202.54 194.47 202.08 192.47 201.16C190.47 200.2 188.91 198.88 187.79 197.2C186.67 195.52 186.11 193.62 186.11 191.5V183.1C186.11 180.82 186.67 178.8 187.79 177.04C188.91 175.28 190.47 173.92 192.47 172.96C194.47 171.96 196.75 171.46 199.31 171.46C201.71 171.46 203.83 171.8 205.67 172.48C207.55 173.16 209.01 174.12 210.05 175.36C211.09 176.56 211.61 177.96 211.61 179.56C211.61 180.8 211.13 181.8 210.17 182.56C209.21 183.32 207.95 183.7 206.39 183.7C205.95 183.7 205.63 183.68 205.43 183.64C205.43 181.92 204.87 180.54 203.75 179.5C202.67 178.46 201.25 177.94 199.49 177.94C197.73 177.94 196.29 178.44 195.17 179.44C194.09 180.44 193.55 181.76 193.55 183.4V190.96C193.55 192.48 194.11 193.72 195.23 194.68C196.35 195.6 197.79 196.06 199.55 196.06C201.31 196.06 202.75 195.54 203.87 194.5C204.99 193.42 205.55 192.06 205.55 190.42C205.79 190.38 206.13 190.36 206.57 190.36C208.13 190.36 209.39 190.72 210.35 191.44C211.31 192.16 211.79 193.14 211.79 194.38C211.79 195.98 211.25 197.4 210.17 198.64C209.13 199.84 207.67 200.8 205.79 201.52C203.91 202.2 201.77 202.54 199.37 202.54ZM228.541 202.54C225.941 202.54 223.581 202.08 221.461 201.16C219.381 200.2 217.741 198.88 216.541 197.2C215.341 195.52 214.741 193.62 214.741 191.5V183.04C214.741 180.88 215.321 178.92 216.481 177.16C217.681 175.4 219.321 174.02 221.401 173.02C223.481 171.98 225.861 171.46 228.541 171.46C231.221 171.46 233.601 171.98 235.681 173.02C237.801 174.02 239.441 175.4 240.601 177.16C241.801 178.92 242.401 180.88 242.401 183.04V191.5C242.401 193.62 241.781 195.52 240.541 197.2C239.341 198.88 237.681 200.2 235.561 201.16C233.481 202.08 231.141 202.54 228.541 202.54ZM228.541 196.12C230.541 196.12 232.101 195.66 233.221 194.74C234.381 193.82 234.961 192.58 234.961 191.02V183.4C234.961 181.76 234.381 180.44 233.221 179.44C232.101 178.4 230.541 177.88 228.541 177.88C226.581 177.88 225.021 178.4 223.861 179.44C222.701 180.44 222.121 181.76 222.121 183.4V191.02C222.121 192.58 222.701 193.82 223.861 194.74C225.021 195.66 226.581 196.12 228.541 196.12ZM247.114 177.22C247.114 175.38 247.694 173.96 248.854 172.96C250.054 171.96 251.854 171.46 254.254 171.46V175.06C253.774 175.62 253.294 176.26 252.814 176.98L253.174 177.22C254.374 175.42 255.914 174.02 257.794 173.02C259.674 171.98 261.754 171.46 264.034 171.46C266.074 171.46 267.874 171.92 269.434 172.84C270.994 173.76 272.194 175.02 273.034 176.62C273.914 178.22 274.354 180.02 274.354 182.02V197.98C274.354 199.58 273.734 200.74 272.494 201.46C271.254 202.18 269.374 202.54 266.854 202.54V183.1C266.854 181.58 266.394 180.34 265.474 179.38C264.594 178.42 263.294 177.94 261.574 177.94C259.534 177.94 257.854 178.58 256.534 179.86C255.214 181.1 254.554 182.66 254.554 184.54V197.98C254.554 199.58 253.954 200.74 252.754 201.46C251.554 202.18 249.674 202.54 247.114 202.54V177.22ZM293.22 202.54C289.38 202.54 286.28 201.86 283.92 200.5C281.6 199.1 280.42 197.24 280.38 194.92C280.38 193.92 280.78 193.08 281.58 192.4C282.42 191.72 283.74 191.36 285.54 191.32C285.9 193.08 286.74 194.44 288.06 195.4C289.38 196.32 290.98 196.78 292.86 196.78C294.9 196.78 296.5 196.52 297.66 196C298.82 195.48 299.4 194.7 299.4 193.66C299.4 192.7 298.92 191.9 297.96 191.26C297.04 190.62 295.2 189.98 292.44 189.34C289.44 188.62 287.1 187.9 285.42 187.18C283.78 186.46 282.56 185.54 281.76 184.42C280.96 183.3 280.56 181.82 280.56 179.98C280.56 177.42 281.64 175.36 283.8 173.8C285.96 172.24 288.92 171.46 292.68 171.46C296.32 171.46 299.34 172.12 301.74 173.44C304.14 174.72 305.34 176.44 305.34 178.6C305.34 179.68 304.94 180.48 304.14 181C303.34 181.52 302.02 181.8 300.18 181.84C299.78 180.24 299.02 179.04 297.9 178.24C296.78 177.44 295.2 177.04 293.16 177.04C291.64 177.04 290.32 177.3 289.2 177.82C288.12 178.34 287.58 179.02 287.58 179.86C287.58 180.74 288.04 181.42 288.96 181.9C289.88 182.38 291.48 182.86 293.76 183.34C298.24 184.3 301.48 185.58 303.48 187.18C305.52 188.78 306.54 190.96 306.54 193.72C306.54 196.4 305.34 198.54 302.94 200.14C300.58 201.74 297.34 202.54 293.22 202.54ZM323.504 202.54C320.264 202.54 317.864 201.6 316.304 199.72C314.744 197.84 313.964 195.42 313.964 192.46V177.58H307.784C307.784 175.7 308.144 174.3 308.864 173.38C309.584 172.46 310.544 172 311.744 172H314.084V167.02C314.084 165.38 314.684 164.22 315.884 163.54C317.084 162.82 318.904 162.46 321.344 162.46V172H329.324C329.324 174 328.944 175.44 328.184 176.32C327.424 177.16 326.204 177.58 324.524 177.58H321.464V192.16C321.464 193.56 321.724 194.56 322.244 195.16C322.804 195.76 323.744 196.06 325.064 196.06C326.464 196.06 327.864 195.68 329.264 194.92C329.664 195.28 329.984 195.74 330.224 196.3C330.464 196.82 330.584 197.36 330.584 197.92C330.584 199.12 329.964 200.2 328.724 201.16C327.484 202.08 325.744 202.54 323.504 202.54ZM351.655 177.94C349.295 177.94 347.375 178.58 345.895 179.86C344.415 181.1 343.675 182.66 343.675 184.54V197.98C343.675 199.58 343.075 200.74 341.875 201.46C340.675 202.18 338.795 202.54 336.235 202.54V177.22C336.235 175.38 336.815 173.96 337.975 172.96C339.175 171.96 340.975 171.46 343.375 171.46V175C342.775 175.68 342.295 176.34 341.935 176.98L342.295 177.22C344.815 173.38 347.975 171.46 351.775 171.46C353.495 171.46 354.795 171.92 355.675 172.84C356.555 173.72 356.995 174.84 356.995 176.2C356.995 177.24 356.715 178.12 356.155 178.84C355.075 178.24 353.575 177.94 351.655 177.94ZM387.19 196.72C387.19 198.6 386.59 200.04 385.39 201.04C384.23 202.04 382.45 202.54 380.05 202.54V198.94C380.57 198.34 381.05 197.68 381.49 196.96L381.13 196.72C378.57 200.6 375.13 202.54 370.81 202.54C368.77 202.54 366.93 202.08 365.29 201.16C363.69 200.2 362.41 198.88 361.45 197.2C360.53 195.52 360.07 193.62 360.07 191.5V176.02C360.07 174.38 360.67 173.22 361.87 172.54C363.11 171.82 364.99 171.46 367.51 171.46V190.96C367.51 192.52 367.99 193.76 368.95 194.68C369.91 195.6 371.29 196.06 373.09 196.06C375.09 196.06 376.69 195.44 377.89 194.2C379.13 192.92 379.75 191.34 379.75 189.46V176.02C379.75 174.38 380.35 173.22 381.55 172.54C382.75 171.82 384.63 171.46 387.19 171.46V196.72ZM407.143 202.54C404.543 202.54 402.243 202.08 400.243 201.16C398.243 200.2 396.683 198.88 395.563 197.2C394.443 195.52 393.883 193.62 393.883 191.5V183.1C393.883 180.82 394.443 178.8 395.563 177.04C396.683 175.28 398.243 173.92 400.243 172.96C402.243 171.96 404.523 171.46 407.083 171.46C409.483 171.46 411.603 171.8 413.443 172.48C415.323 173.16 416.783 174.12 417.823 175.36C418.863 176.56 419.383 177.96 419.383 179.56C419.383 180.8 418.903 181.8 417.943 182.56C416.983 183.32 415.723 183.7 414.163 183.7C413.723 183.7 413.403 183.68 413.203 183.64C413.203 181.92 412.643 180.54 411.523 179.5C410.443 178.46 409.023 177.94 407.263 177.94C405.503 177.94 404.063 178.44 402.943 179.44C401.863 180.44 401.323 181.76 401.323 183.4V190.96C401.323 192.48 401.883 193.72 403.003 194.68C404.123 195.6 405.563 196.06 407.323 196.06C409.083 196.06 410.523 195.54 411.643 194.5C412.763 193.42 413.323 192.06 413.323 190.42C413.563 190.38 413.903 190.36 414.343 190.36C415.903 190.36 417.163 190.72 418.123 191.44C419.083 192.16 419.563 193.14 419.563 194.38C419.563 195.98 419.023 197.4 417.943 198.64C416.903 199.84 415.443 200.8 413.563 201.52C411.683 202.2 409.543 202.54 407.143 202.54ZM437.586 202.54C434.346 202.54 431.946 201.6 430.386 199.72C428.826 197.84 428.046 195.42 428.046 192.46V177.58H421.866C421.866 175.7 422.226 174.3 422.946 173.38C423.666 172.46 424.626 172 425.826 172H428.166V167.02C428.166 165.38 428.766 164.22 429.966 163.54C431.166 162.82 432.986 162.46 435.426 162.46V172H443.406C443.406 174 443.026 175.44 442.266 176.32C441.506 177.16 440.286 177.58 438.606 177.58H435.546V192.16C435.546 193.56 435.806 194.56 436.326 195.16C436.886 195.76 437.826 196.06 439.146 196.06C440.546 196.06 441.946 195.68 443.346 194.92C443.746 195.28 444.066 195.74 444.306 196.3C444.546 196.82 444.666 197.36 444.666 197.92C444.666 199.12 444.046 200.2 442.806 201.16C441.566 202.08 439.826 202.54 437.586 202.54ZM455.297 168.64C453.857 168.64 452.657 168.22 451.697 167.38C450.777 166.5 450.317 165.38 450.317 164.02C450.317 162.7 450.777 161.62 451.697 160.78C452.657 159.9 453.857 159.46 455.297 159.46C456.737 159.46 457.917 159.9 458.837 160.78C459.797 161.62 460.277 162.7 460.277 164.02C460.277 165.38 459.797 166.5 458.837 167.38C457.917 168.22 456.737 168.64 455.297 168.64ZM451.517 176.02C451.517 174.38 452.137 173.22 453.377 172.54C454.617 171.82 456.497 171.46 459.017 171.46V197.98C459.017 199.58 458.397 200.74 457.157 201.46C455.917 202.18 454.037 202.54 451.517 202.54V176.02ZM478.385 202.54C475.785 202.54 473.425 202.08 471.305 201.16C469.225 200.2 467.585 198.88 466.385 197.2C465.185 195.52 464.585 193.62 464.585 191.5V183.04C464.585 180.88 465.165 178.92 466.325 177.16C467.525 175.4 469.165 174.02 471.245 173.02C473.325 171.98 475.705 171.46 478.385 171.46C481.065 171.46 483.445 171.98 485.525 173.02C487.645 174.02 489.285 175.4 490.445 177.16C491.645 178.92 492.245 180.88 492.245 183.04V191.5C492.245 193.62 491.625 195.52 490.385 197.2C489.185 198.88 487.525 200.2 485.405 201.16C483.325 202.08 480.985 202.54 478.385 202.54ZM478.385 196.12C480.385 196.12 481.945 195.66 483.065 194.74C484.225 193.82 484.805 192.58 484.805 191.02V183.4C484.805 181.76 484.225 180.44 483.065 179.44C481.945 178.4 480.385 177.88 478.385 177.88C476.425 177.88 474.865 178.4 473.705 179.44C472.545 180.44 471.965 181.76 471.965 183.4V191.02C471.965 192.58 472.545 193.82 473.705 194.74C474.865 195.66 476.425 196.12 478.385 196.12ZM496.958 177.22C496.958 175.38 497.538 173.96 498.698 172.96C499.898 171.96 501.698 171.46 504.098 171.46V175.06C503.618 175.62 503.138 176.26 502.658 176.98L503.018 177.22C504.218 175.42 505.758 174.02 507.638 173.02C509.518 171.98 511.598 171.46 513.878 171.46C515.918 171.46 517.718 171.92 519.278 172.84C520.838 173.76 522.038 175.02 522.878 176.62C523.758 178.22 524.198 180.02 524.198 182.02V197.98C524.198 199.58 523.578 200.74 522.338 201.46C521.098 202.18 519.218 202.54 516.698 202.54V183.1C516.698 181.58 516.238 180.34 515.318 179.38C514.438 178.42 513.138 177.94 511.418 177.94C509.378 177.94 507.698 178.58 506.378 179.86C505.058 181.1 504.398 182.66 504.398 184.54V197.98C504.398 199.58 503.798 200.74 502.598 201.46C501.398 202.18 499.518 202.54 496.958 202.54V177.22Z"
			fill="white"
		/>
	</svg>
)

export default UnderConstruction
